-- Roll back the M02-A multi-application and tenant configuration model.

DELETE FROM qipai_schema_migrations WHERE version = '2026061803';
DROP TABLE IF EXISTS qipai_tenant_configs;
DROP TABLE IF EXISTS qipai_tenant_apps;
DROP TABLE IF EXISTS qipai_platform_apps;
