-- Roll back M01-C asynchronous task tables.

DELETE FROM qipai_schema_migrations WHERE version = '2026061802';
DROP TABLE IF EXISTS qipai_async_tasks;
DROP TABLE IF EXISTS qipai_outbox_events;
